Muons in Nylon (type 6, 6/6) [(CH(CH_2)_5NO)_n]

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54790 1.180 63.9 0.11818 3.3826 0.1261 2.5759 3.0289 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.024 8.025 6.877 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.255 6.255 1.258 × 10^0 20.0 MeV 6.802 × 10^1 4.881 4.881 2.357 × 10^0 30.0 MeV 8.509 × 10^1 3.784 3.784 4.716 × 10^0 40.0 MeV 1.003 × 10^2 3.229 3.230 7.596 × 10^0 80.0 MeV 1.527 × 10^2 2.416 2.417 2.236 × 10^1 100. MeV 1.764 × 10^2 2.262 2.262 3.094 × 10^1 140. MeV 2.218 × 10^2 2.103 2.103 4.937 × 10^1 200. MeV 2.868 × 10^2 2.011 2.011 7.865 × 10^1 300. MeV 3.917 × 10^2 1.974 0.000 1.974 1.290 × 10^2 328. MeV 4.201 × 10^2 1.973 0.000 1.973 Minimum ionization 400. MeV 4.945 × 10^2 1.978 0.000 1.978 1.796 × 10^2 800. MeV 8.995 × 10^2 2.048 0.000 0.000 2.049 3.784 × 10^2 1.00 GeV 1.101 × 10^3 2.081 0.000 0.000 2.082 4.752 × 10^2 1.40 GeV 1.502 × 10^3 2.135 0.000 0.001 2.136 6.648 × 10^2 2.00 GeV 2.103 × 10^3 2.194 0.000 0.000 0.001 2.196 9.417 × 10^2 3.00 GeV 3.104 × 10^3 2.261 0.001 0.001 0.001 2.264 1.390 × 10^3 4.00 GeV 4.104 × 10^3 2.308 0.001 0.001 0.002 2.313 1.826 × 10^3 8.00 GeV 8.105 × 10^3 2.417 0.003 0.003 0.004 2.427 3.510 × 10^3 10.0 GeV 1.011 × 10^4 2.449 0.004 0.004 0.005 2.463 4.328 × 10^3 14.0 GeV 1.411 × 10^4 2.497 0.006 0.007 0.007 2.517 5.934 × 10^3 20.0 GeV 2.011 × 10^4 2.546 0.010 0.011 0.009 2.576 8.288 × 10^3 30.0 GeV 3.011 × 10^4 2.598 0.016 0.019 0.014 2.647 1.212 × 10^4 40.0 GeV 4.011 × 10^4 2.634 0.022 0.028 0.018 2.703 1.585 × 10^4 80.0 GeV 8.011 × 10^4 2.717 0.051 0.069 0.035 2.871 3.019 × 10^4 100. GeV 1.001 × 10^5 2.743 0.066 0.091 0.043 2.943 3.706 × 10^4 140. GeV 1.401 × 10^5 2.781 0.098 0.136 0.059 3.075 5.036 × 10^4 200. GeV 2.001 × 10^5 2.821 0.148 0.209 0.084 3.262 6.930 × 10^4 300. GeV 3.001 × 10^5 2.867 0.233 0.332 0.126 3.558 9.863 × 10^4 400. GeV 4.001 × 10^5 2.899 0.322 0.460 0.168 3.850 1.256 × 10^5 800. GeV 8.001 × 10^5 2.977 0.693 0.996 0.340 5.007 2.165 × 10^5 1.00 TeV 1.000 × 10^6 3.003 0.884 1.274 0.427 5.588 2.543 × 10^5 1.16 TeV 1.157 × 10^6 3.020 1.034 1.488 0.497 6.040 Muon critical energy 1.40 TeV 1.400 × 10^6 3.042 1.270 1.826 0.606 6.744 3.193 × 10^5 2.00 TeV 2.000 × 10^6 3.083 1.864 2.672 0.877 8.498 3.985 × 10^5 3.00 TeV 3.000 × 10^6 3.131 2.860 4.082 1.345 11.418 4.996 × 10^5 4.00 TeV 4.000 × 10^6 3.166 3.874 5.512 1.820 14.372 5.775 × 10^5 8.00 TeV 8.000 × 10^6 3.251 7.982 11.273 3.800 26.306 7.802 × 10^5 10.0 TeV 1.000 × 10^7 3.279 10.061 14.176 4.820 32.336 8.487 × 10^5 14.0 TeV 1.400 × 10^7 3.322 14.209 19.959 6.922 44.412 9.538 × 10^5 20.0 TeV 2.000 × 10^7 3.368 20.487 28.682 10.153 62.690 1.067 × 10^6 30.0 TeV 3.000 × 10^7 3.421 30.941 43.195 15.764 93.320 1.197 × 10^6 40.0 TeV 4.000 × 10^7 3.459 41.454 57.756 21.524 124.192 1.290 × 10^6 80.0 TeV 8.000 × 10^7 3.553 83.604 116.050 45.708 248.916 1.513 × 10^6 100. TeV 1.000 × 10^8 3.585 104.736 145.233 58.248 311.801 1.584 × 10^6