Muons in glycerol (C_{3}H_{5}(OH)_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54292 & 1.261 & 72.6 & 0.10168 & 3.4481 & 0.1653 & 2.6862 & 3.2267 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.823  7.823  7.062 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.101  6.101  1.291 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.764  4.764  2.417 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.695  3.696  4.834 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.155  3.155  7.781 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.368  2.368  2.288 × 10^{1}
100. MeV 1.764 × 10^{2} 2.219  2.219  3.163 × 10^{1}
140. MeV 2.218 × 10^{2} 2.065  2.065  5.040 × 10^{1}
200. MeV 2.868 × 10^{2} 1.976  1.976  8.022 × 10^{1}
300. MeV 3.917 × 10^{2} 1.942  0.000  1.942  1.314 × 10^{2}
318. MeV 4.105 × 10^{2} 1.941  0.000  1.941 Minimum ionization
400. MeV 4.945 × 10^{2} 1.947  0.000  1.947  1.829 × 10^{2}
800. MeV 8.995 × 10^{2} 2.019  0.000  0.000  2.019  3.847 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.052  0.000  0.000  2.053  4.829 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.106  0.000  0.001  2.107  6.751 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.165  0.001  0.000  0.001  2.167  9.557 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.233  0.001  0.001  0.001  2.236  1.409 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.280  0.001  0.001  0.002  2.285  1.852 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.389  0.003  0.003  0.004  2.399  3.555 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.422  0.004  0.004  0.005  2.435  4.382 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.469  0.007  0.007  0.007  2.490  6.005 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.518  0.011  0.012  0.009  2.550  8.385 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.570  0.017  0.021  0.014  2.622  1.225 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.606  0.024  0.031  0.018  2.679  1.602 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.688  0.056  0.075  0.034  2.853  3.047 × 10^{4}
100. GeV 1.001 × 10^{5} 2.713  0.072  0.099  0.043  2.927  3.739 × 10^{4}
140. GeV 1.401 × 10^{5} 2.751  0.107  0.149  0.059  3.066  5.073 × 10^{4}
200. GeV 2.001 × 10^{5} 2.791  0.161  0.228  0.084  3.263  6.970 × 10^{4}
300. GeV 3.001 × 10^{5} 2.836  0.254  0.362  0.126  3.577  9.895 × 10^{4}
400. GeV 4.001 × 10^{5} 2.868  0.351  0.501  0.167  3.888  1.258 × 10^{5}
800. GeV 8.001 × 10^{5} 2.946  0.753  1.084  0.338  5.121  2.151 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.971  0.961  1.385  0.425  5.742  2.520 × 10^{5}
1.07 TeV 1.070 × 10^{6} 2.979  1.034  1.489  0.456  5.957 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.009  1.380  1.984  0.602  6.976  3.151 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.051  2.025  2.903  0.872  8.850  3.913 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.098  3.105  4.432  1.337  11.971  4.881 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.132  4.204  5.982  1.809  15.128  5.623 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.217  8.655  12.229  3.776  27.877  7.541 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.244  10.906  15.375  4.790  34.316  8.187 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.287  15.400  21.644  6.878  47.209  9.177 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.332  22.198  31.100  10.087  66.717  1.024 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.385  33.517  46.833  15.657  99.393  1.146 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.423  44.898  62.618  21.375 132.314  1.233 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.516  90.537 125.808  45.375 265.237  1.442 × 10^{6}
100. TeV 1.000 × 10^{8} 3.547 113.419 157.441  57.817 332.225  1.510 × 10^{6}